en	BufferSequence
zh-hans	缓冲区序列

en	A [*BufferSequence] is a type meeting either of the following requirements:
zh-hans	[*缓冲区序列] 是指满足以下任一要求的类型：

en	* __ConstBufferSequence__ * __MutableBufferSequence__